; module-definition file for generic -- used by LINK.EXE

NAME         BmpEf       ; application's module name

DESCRIPTION  'BMPEF Windows Application'

EXETYPE      WINDOWS       ; required for all Windows applications

STUB         'WINSTUB.EXE' ; Generates error message if application
                           ; is run without Windows

;CODE can be moved in memory and discarded/reloaded
CODE  PRELOAD MOVEABLE DISCARDABLE

;DATA must be MULTIPLE if program can be invoked more than once
DATA  PRELOAD MOVEABLE MULTIPLE


HEAPSIZE     8196
STACKSIZE    8196          ; recommended minimum for Windows applications


; All functions that will be called by any Windows routine
; MUST be exported.
     